Types of “No-Prep” Veneers

Porcelain veneers have become a popular option in the past few years for dental patients who wish to brighten and repair their smile. While traditional porcelain veneers offer a lifelike quality and excellent durability, their placement usually requires the removal of some of the tooth surface enamel, which is an irreversible procedure.

A promising solution for patients who wish to avoid altering the tooth structure are no-prep or minimally invasive veneers. No-prep veneers offer the same advantages of traditional veneers but eliminate or reduce the need to grind, cut, or file down the teeth.

Lumineers are one of the most popular of the “no-prep” variety of veneers. Lumineers use an extremely thin veneer that is placed on the front side of your teeth. The placement of Lumineers does not require the modification of the natural tooth structure or the use of temporary veneers. Lumineers produce beautiful smiles for patients who prefer to not physically alter their teeth.

DURAthin veneers are similar to Lumineers in that they require no modification of the tooth structure or filing of the enamel. DURAthin veneers utilize very thin customized porcelain shells that match the shape and color of your teeth. These shells are roughly the width of a contact lens and are bonded to the front of your teeth. Because of their size and shape, DURAthin veneers are an ideal choice for correcting minor cosmetic dental issues.

Vivaneers are among the thinnest veneers available, making them easy to apply in as little as one office visit. Because they require no preparation to your natural tooth, there is no need for shots, drilling or anesthesia. If you are unhappy with the results, Vivaneers are easily reversible.

To find out if these or other “no-prep” veneer options would be a solution for improving your smile, schedule a consultation with a Louisville cosmetic dentist Dr. Smythe .

The post Types of “No-Prep” Veneers appeared first on William H. Smythe DMD.